-- module-disable: www.archline.hu:mod_seolite folder=-
-- prefix=dtch_ result=skipped-no-matching-row original_enabled=None

-- prefix=eng_ result=disabled original_enabled=1
-- forward:
UPDATE `eng_extensions` SET enabled = 0 WHERE element = 'mod_seolite';
-- reverse:
UPDATE `eng_extensions` SET enabled = 1 WHERE element = 'mod_seolite';

-- prefix=jml_ result=skipped-no-matching-row original_enabled=None

-- prefix=lakber_ result=skipped-no-matching-row original_enabled=None

-- prefix=old_ result=skipped-no-matching-row original_enabled=None

-- prefix=oldeng_ result=skipped-no-matching-row original_enabled=None

